FY:TUBE:Viscous Drag

FY:TUBE:Wave

FZ:TUBE:Buoyancy

Test of "Very Deep" Vertical Tube

02.85.68.411.2

1416.8

19.6

22.4

25.2

28Event

-0.30.46

1.22

1.98

2.74

3.54.26

5.02

5.78

6.54

7.3FY:TUBE:Viscous Drag * 10**3